)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9

] -2)c

) [(GeV/ yd_Tp/(d

N^2) d_Tpπ

1/(2 evN 1/

-7 10 -6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10 210

S 0K

= 5.02 TeV NNs ALICE, p-Pb, < 0.5 CMS y 0 <